
              Welcome to the EnlightenDSM 

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

Standard Install:

Standard Install will install all EnlightenDSM components onto the current 
local machine and management agents onto remote machines. A temporary 
license that allows 90 days of full usage will also be installed.
This is the recommended method when installing for the first time.

Custom Install:

Custom Install enables fine grain control over the installation of each
component of EnlightenDSM, allowing the configuration of multiple remote 
GUIs, remote storage repositories, and modification of the license file.
Custom Install must be used when upgrading. 

Note: 

The EnlightenDSM Installer must be run as user root. If you are not root,
close the install program and restart it as root.

The root password is also required for all machines to be installed.

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

(c) 1996 - 1999 Enlighten Software Solutions, Inc.
